CMS Cost Estimate - Version84-Oct-96No.ItemBristolHelsinkiLisbonPalaiseauWisconsinTotal IncomeTotal Cost CHF6.1.1CALORIMETER TRIGGER44150014031405407878287861.540

6.1.1.1TriggerPrimitiveCard10081008.000

6.1.1.1.1TPG605605604.800

6.1.1.1.2Sync TX403403403.2000.000

6.1.1.2Sync TX (HCAL)419419419.400

0.000

6.1.1.3Opt TX and fibre10050010050012001233.900

6.1.1.4Trigger Crate250249.717

6.1.1.4.1Crate151514.820

6.1.1.4.2Backplane146146145.9776.1.1.4.3Power Supply898988.9200.000

6.1.1.5CrateMonitorCard2524.700

6.1.1.5.1Parts10109.880

6.1.1.5.2Board777.4106.1.1.5.3Assembly777.4100.000

6.1.1.6ClockControlCard7373.112

6.1.1.6.1Parts484848.412

6.1.1.6.2Board151514.8206.1.1.6.3Assembly10109.8800.000

7 October 19961�J. Varela

CMS Cost Estimate - Version84-Oct-96No.ItemBristolHelsinkiLisbonPalaiseauWisconsinTotal IncomeTotal Cost CHF

6.1.1.7ReceiverCard2399.1536.1.1.7.1Opt Rx821821820.800

6.1.1.7.2Sync Rx426426425.6006.1.1.7.3Adder 105105104.8806.1.1.7.4Boundary Scan000.0006.1.1.7.5Parts761761761.3536.1.1.7.6Board158158158.0806.1.1.7.7Assembly128128128.4400.000

6.1.1.8ElectronIsolationCard651650.864

6.1.1.8.1Electron ID707069.920

6.1.1.8.2Boundary Scan000.0006.1.1.8.3Parts443443442.6246.1.1.8.4Board797979.0406.1.1.8.5Assembly595959.2800.000

6.1.1.9JetSummaryCard10099.761

6.1.1.9.1Adder998.740

6.1.1.9.2Sorter333.0406.1.1.9.3Boundary Scan000.0006.1.1.9.4Parts616160.8116.1.1.9.5Board151514.8206.1.1.9.6Assembly121212.3500.000

7 October 19962�J. Varela

CMS Cost Estimate - Version84-Oct-96No.ItemBristolHelsinkiLisbonPalaiseauWisconsinTotal IncomeTotal Cost CHF

6.1.1.10Cal. Global202202.0916.1.1.10.1Trigger crate131313.143

6.1.1.10.2ClockControlCard443.8486.1.1.10.3Receiver/Sort Card737373.2006.1.1.10.4Receiver/Adder Card353535.1006.1.1.10.5Final Sort Card474746.8006.1.1.10.6Final Adder Card151515.0006.1.1.10.7Luminosity measurement151515.0000.000

6.1.1.11Cables1919.490

6.1.1.11.1Regional Trigger Cables999.490

6.1.1.11.2Global Trigger Cables101010.0000.000

6.1.1.12Prototypes and Spares566566.352

6.1.1.12.1Trigger Primitives P&S150150150.000

6.1.1.12.2Reg. Trigger P&S391391391.3526.1.1.12.3Cal. Global P&S252525.0000.000

6.1.1.13Monitoring & Test178178.000

6.1.1.13.1Trigger primitives505050.000

6.1.1.13.2Regional Trigger787878.0006.1.1.13.3Global trigger252525.0006.1.1.13.4Readout and Control252525.0000.000

7 October 19963�J. Varela

CMS Cost Estimate - Version84-Oct-96No.ItemBristolHelsinkiLisbonPalaiseauWisconsinTotal IncomeTotal Cost CHF

6.1.1.14ASICs Development506506.0006.1.1.14.1TPG ASIC100100100.000

6.1.1.14.2Sync TX ASIC100100100.0006.1.1.14.3Sync RX ASIC100100100.0006.1.1.14.4Adder ASIC656565.0006.1.1.14.5Electron ID ASIC656565.0006.1.1.14.6Sorter ASIC767676.0006.1.1.14.7Boundary Scan ASIC000.0000.000

6.1.1.15Readout and Control231231.000

6.1.1.15.1ROC (Mon&DAQ Proc)140140140.000

6.1.1.15.2FrontEndDriver161616.0006.1.1.15.3ROC Back-End252525.0006.1.1.15.4Software505050.000

7 October 19964�J. Varela